INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (27206, 'EPSG', 27206, '+proj=tmerc +lat_0=-37.7612498055556 +lon_0=176.46619725 +k=1 +x_0=300000 +y_0=700000 +ellps=intl +nadgrids=nzgd2kgrid0005.gsb +units=m +no_defs +type=crs', 'PROJCS["NZGD49 / Bay of Plenty Circuit",GEOGCS["NZGD49",DATUM["New_Zealand_Geodetic_Datum_1949",SPHEROID["International 1924",6378388,297],EXTENSION["PROJ4_GRIDS","nzgd2kgrid0005.gsb"]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4272"]],PROJECTION["Transverse_Mercator"],PARAMETER["latitude_of_origin",-37.7612498055556],PARAMETER["central_meridian",176.46619725],PARAMETER["scale_factor",1],PARAMETER["false_easting",300000],PARAMETER["false_northing",700000],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AUTHORITY["EPSG","27206"]]');